Ball 2.5mm Stations Consecutive Chain

Vendor: KURY COLLECTION
Type: Chains
Price: 545.00 - 675.00 (3 variants)

Kury Collection

14K Yellow Gold

Chain is 14k yellow gold

Beads are 2.5mm, less than one inch between stations.

Add a pendant or two, or wear it with other chain layers.

Pendants sold separately.

One year warranty on clasp.